=======                                             NOSview [137]
BYE.HLP
=======

USAGE
 B[ye]

DESCRIPTION
 The bye command is used when you want to exit from the NOS
 MBOX.  This will  close your  mailbox  file and remove any
 messages that you have deleted with the K[ill] command.

EXAMPLES
 bye

